%#BIBTEX bibtex main
%
%  水惑星設定における風成循環
%
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%             Style  Setting             %%%%%%%%
% フォント: 12point (最大), 片面印刷
\documentclass[a4j,12pt,openbib,oneside]{jreport}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%             Package Include            %%%%%%%%
\usepackage[dvipdfmx]{graphicx}
\usepackage{Dennou6}		% 電脳スタイル ver 6
\usepackage{ascmac}
\usepackage{tabularx}
\usepackage{amssymb}
\usepackage{amsmath}
\usepackage{mathrsfs}
\usepackage{framed}
\usepackage[round]{natbib}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%            PageStyle Setting           %%%%%%%%
\pagestyle{DAmyheadings}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%        Title and Auther Setting        %%%%%%%%
%%
%%  [ ] はヘッダに書き出される.
%%  { } は表題 (\maketitle) に書き出される.

\Dtitle{海洋における対流の表現}   % 変更不可
\Dauthor{河合 佑太}            % ゼミ担当者の名前
\Ddate{\the\year/\the\month/\the\day}        % ゼミの日時 (毎回変更すること)
\Dfile{main.tex}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%   Set Counter (chapter, section etc. ) %%%%%%%%
\setcounter{chapter}{0}    % 章番号
\setcounter{section}{0}    % 節番号
\setcounter{equation}{0}   % 式番号
\setcounter{page}{1}     % 必ず開始ページは明記する
\setcounter{figure}{0}     % 図番号
\setcounter{table}{0}      % 表番号
%\setcounter{footnote}{0}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%        Counter Output Format           %%%%%%%%
\def\thechapter{\arabic{chapter}}
\def\thesection{\arabic{chapter}.\arabic{section}}
\def\thesubsection{\arabic{chapter}.\arabic{section}.\arabic{subsection}}
\def\theequation{\arabic{chapter}.\arabic{section}.\arabic{equation}}
\def\thepage{\arabic{page}}
\def\thefigure{\arabic{chapter}.\arabic{section}.\arabic{figure}}
\def\thetable{\arabic{chapter}.\arabic{section}.\arabic{table}}
\def\thefootnote{*\arabic{footnote}}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%        Dennou-Style Definition         %%%%%%%%

%% 改段落時の空行設定
\Dparskip      % 改段落時に一行空行を入れる
%\Dnoparskip    % 改段落時に一行空行を入れない

%% 改段落時のインデント設定
\Dparindent    % 改段落時にインデントする
%\Dnoparindent  % 改段落時にインデントしない

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%             Text Start                 %%%%%%%%
\begin{document}

\tableofcontents

\chapter{準備}

%%%%%%%%%%
\input{introduction}

%%%%%%%%%
\input{preliminary}

%%%%%%%%%
\chapter{対流のパラメタリゼーション}
\input{convective_adjustment}

\newpage
%%

%% 参考文献
\bibliographystyle{plainnat}
\bibliography{./../../reflist/Dennou-OGCM_reflist}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\end{document}
%%%%%%%%              Text End                  %%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
