\hypertarget{interfacegtool__history__nmlinfo__generic_1_1hstnmlinfosetvalidname}{}\section{gtool\+\_\+history\+\_\+nmlinfo\+\_\+generic\+:\+:hstnmlinfosetvalidname Interface Reference}
\label{interfacegtool__history__nmlinfo__generic_1_1hstnmlinfosetvalidname}\index{gtool\+\_\+history\+\_\+nmlinfo\+\_\+generic\+::hstnmlinfosetvalidname@{gtool\+\_\+history\+\_\+nmlinfo\+\_\+generic\+::hstnmlinfosetvalidname}}


\subsection{Detailed Description}


Definition at line 471 of file gtool\+\_\+history\+\_\+nmlinfo\+\_\+generic.\+f90.



The documentation for this interface was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
gtool/gtool\+\_\+history\+\_\+nmlinfo/\hyperlink{gtool__history__nmlinfo__generic_8f90}{gtool\+\_\+history\+\_\+nmlinfo\+\_\+generic.\+f90}\end{DoxyCompactItemize}
