\hypertarget{hsclse_8f90}{}\section{gtool/gtool\+\_\+history/hsclse.f90 File Reference}
\label{hsclse_8f90}\index{gtool/gtool\+\_\+history/hsclse.\+f90@{gtool/gtool\+\_\+history/hsclse.\+f90}}
\subsection*{Functions/\+Subroutines}
\begin{DoxyCompactItemize}
\item 
subroutine \hyperlink{hsclse_8f90_abbf4eedc32a279a8759840a0a7c4f553}{hsclse}
\end{DoxyCompactItemize}


\subsection{Function/\+Subroutine Documentation}
\mbox{\Hypertarget{hsclse_8f90_abbf4eedc32a279a8759840a0a7c4f553}\label{hsclse_8f90_abbf4eedc32a279a8759840a0a7c4f553}} 
\index{hsclse.\+f90@{hsclse.\+f90}!hsclse@{hsclse}}
\index{hsclse@{hsclse}!hsclse.\+f90@{hsclse.\+f90}}
\subsubsection{\texorpdfstring{hsclse()}{hsclse()}}
{\footnotesize\ttfamily subroutine hsclse (\begin{DoxyParamCaption}{ }\end{DoxyParamCaption})}



Definition at line 15 of file hsclse.\+f90.


\begin{DoxyCode}
15   \textcolor{comment}{!}
16   \textcolor{comment}{!== 機能}
17   \textcolor{comment}{!}
18   \textcolor{comment}{! ヒストリーを閉じる.}
19 
20   \textcolor{keywordtype}{use }\hyperlink{namespacegtool__history}{gtool\_history}
21     
22   \textcolor{keyword}{CALL }historyclose
23 
\end{DoxyCode}
